
    MODIFY HOST NAMING SERVICES

    Modify Fields

    This window contains the following fields:

    Hostname

    This view-only field shows which host's naming service configuration
    is currently being modified.

    NIS

    You can use these toggles to specify if you're using the NIS naming
    service for this configuration. If you turn this field On, the NIS+
    fields will be automatically turned Off; these two naming services
    are mutually exclusive for any particular host.

    These fields are only available if the NIS toggle is set to On.

    NIS Domain Name

    Use this field to specify the domain name for your NIS server.

    NIS Server

    Use this field to specify which NIS Server this host will use.

    NIS+

    You can use these toggles to specify if you're using the NIS+ naming
    service for this configuration. If you turn this field On, the NIS
    fields will be automatically turned Off; these two naming services
    are mutually exclusive for any particular host.

    These fields are only available if the NIS+ toggle is set to On.

    NIS+ Domain Name

    Use this field to specify the domain name for your NIS+ server.

    NIS+ Server

    Use this field to specify which NIS Server this host will use.


    Root Password

    Use this field to specify the root password for the server shown in
    the NIS+ Server field.

    DNS

    You can use these toggles to specify if you're using the DNS naming
    service for this configuration. These fields are only available if
    the DNS toggle is set to On.

    DNS Domain Name

    Use this field to specify the domain name for your DNS server.

    DNS Servers

    Use this field to specify which DNS Servers this host will use.

    Modify Buttons

    This window contains the following buttons:

    Modify

    Click on this button to add the specified combination of NIS and/or
    DNS host-server connections. Enlighten will prompt you to confirm
    your action, especially if you're disabling NIS, NIS+, and/or DNS.

    Next

    Click on the Next button to view and/or modify additional host-
    server configurations if you've selected more than one to modify. No
    changes will be made to the configuration you're currently viewing.

    Cancel

    Click on this button to close the window without making any changes.

